Rayburn 308K Boiler Cooker – Oil

Compact performance with ultimate flexibility.  The Rayburn 308K models work well in both traditional and contemporary spaces and deliver exceptional performance.

Rayburn 308K
The AGA Rayburn 308K, with chrome lids is designed to give you outstanding cooking facilities and piping hot water,

and works well in both traditional and contemporary spaces delivering exceptional performance. The 308K models are available in oil and offer hot water and fabulous cast-iron cooking. A generous hotplate takes up to five saucepans and is complemented by a main cooking oven and large warming oven.

Specifications | 308K |

Cooking
Domestic hot water
Central heating

Yes
Yes
–

Cast iron main oven
Lower warming oven

Yes
Yes

Manual controls
Thermostatic controls

Yes
–

Conventional flue system | Yes |
Central Heating Hot Water System: | |

Gravity DHW & pumped open
heating system

–

Gravity DHW | Yes |
Hot Water Storage | 140Ltr (30 gal) |

Boiler Output

8,000 Btu/h
2.3 kW

Weight | 300kg |

Standard Colours Cream/Black/Dark Blue/White
Special Colours (Additional Charge) – Pewter, Dartmouth Blue, Pearl Ashes, Aubergine, Duck Egg Blue, Blush, Salcombe Blue, Slate.

The post Rayburn 308K Boiler Cooker – Oil appeared first on Dean Forge Stoves.