Rayburn 480AG Natural Gas & 480AL LPG Gas

Highly efficient and truly versatile range cooker for cooking, domestic hot water and central heating.

Rayburn 400 models are perfect for today’s fitted kitchens, compatible with the standard height and depth of 600mm worktops. They also offer fabulous performance, be it for cooking, heating or hot water. With central heating models providing a variety of heating outputs, they are suited to many sizes of home.

Most of the models feature an integral timer, plus the option of an external programmer, giving you the flexibility to control your cooking and heating requirements. And the flexibility doesn’t stop there. A 400 Series Rayburn can either be flued through a conventional flue to allow the cooker to be installed virtually anywhere, with an output of 17.6-23.4 KW, the Rayburn 480 AL will provide ample heating and hot water, as well as great cooking performance. Optional external programmers are available, giving flexibility to control cooking and heating requirements. Designed with large cast-iron ovens and a generous hotplate which can accommodate up to 6 saucepans, the Rayburn 480 AG offers excellent cooking capacity for food that simply tastes better.

Model Name

480AG Natural Gas

Height (mm)

910

Width (mm)

905

Depth (mm)

542

Weight (kg)

420

No. of Ovens

2

Simmering Oven

Yes

Roasting/Baking Oven

Yes

Boiling / Simmering Plate

Yes

Central Heating System Type

Fully pumped open and sealed

No. of Radiators

16

Model Name

480AL Propane Gas

Height (mm)

910

Width (mm)

905

Depth (mm)

542

Weight (kg)

420

No. of Ovens

2

Simmering Oven

Yes

Roasting/Baking Oven

Yes

Boiling / Simmering Plate

Yes

Central Heating System Type

Fully pumped open and sealed

No. of Radiators

16

Standard Colours Cream/Black/Dark Blue/White
Special Colours (Additional Charge) – Pewter, Dartmouth Blue, Pearl Ashes, Aubergine, Duck Egg Blue, Blush, Salcombe Blue, Slate.

The post Rayburn 480AG Natural Gas & 480AL LPG Gas appeared first on Dean Forge Stoves.