Rayburn Heatranger 80K Oil

The Rayburn Heatranger 80 Oil is reliable, flexible and controllable, offering hot water, heating and radiant heat cooking. With large capacity cast-iron ovens for roasting, baking and simmering, and a large hotplate for boiling and simmering, the Rayburn Heatranger allows you to master all culinary styles.

The Heatranger has HVO (95% Hydrotreated Vegetable Oil) compatible burners making the appliance eco-friendly, carbon-free and future-ready. HVO is invaluable in helping the UK achieve its net zero carbon target, reducing up to 90% of net CO2 emissions.

Thanks to its digital display and electronic controls, you can easily control cooking and boiler functions independently. The Rayburn Heatranger 80K offers a boiler output of 80,000 Btu/h or 23.45kW.

Model Name

80K

Height (mm)

915

Width (mm)

920

Depth (mm)

611

Weight (kg)

305

No. of Ovens

2

Simmering Oven

Yes

Roasting/Baking Oven

Yes

Boiling / Simmering Plate

Yes

Programmer /Timer Option

Yes

Central Heating System Type

Gravity DHW & Sealed

No. of Radiators

42.5 m2 (457 ft.2) Heating Surface Only

Standard Colours Cream/Black/Dark Blue/White
Special Colours (Additional Charge) – Pewter, Dartmouth Blue, Pearl Ashes, Aubergine, Duck Egg Blue, Blush, Salcombe Blue, Slate.

The post Rayburn Heatranger 80K Oil appeared first on Dean Forge Stoves.